Empresa de Trump despide a 560 empleados de hotel en Miami-Dade

La compañía Trump Miami Resorts Management notificó a las autoridades de Florida que unos 560 trabajadores del complejo hotelero y golfístico que posee en la localidad de Doral, en el condado de Miami-Dade, han sido o van a ser despedidos debido al cierre del establecimiento por las medidas tomadas por la pandemia de COVID-19.

Según las notificaciones enviadas por la organización empresarial del presidente de Estados Unidos, Donald Trump, a las autoridades del Departamento de Oportunidad Económica de Florida y del condado Miami-Dade, la medida es de carácter temporal.

El Trump National Doral está temporalmente cerrado como el resto de instalaciones hoteleras en Miami-Dade y otras zonas de Florida como medida para detener la propagación del coronavirus. Solo el personal esencial sigue trabajando de acuerdo con la notificación.

La comunicación indica que Trump Miami Resorts Management ya avisó a los trabajadores que han sido suspendidos de empleo y sueldo o despedidos temporalmente. La mayoría de estas personas laboraban en puestos gastronómicos, hoteleros o del golf y ninguno tiene afiliación sindical.

Te puede interesar: Miami-Dade es el condado de Florida con mayor número de muertes

La empresa hace hincapié en la naturaleza “repentina, dramática e imprevista” de la “calamidad” de la COVID-19, que llevó a las órdenes de reducir o paralizar las actividades de negocios en Florida.

Desde el 19 de marzo el Trump National Doral ha prescindido gradualmente de los empleados en puestos no esenciales y en la actualidad no sabe cuándo podrá reanudar sus operaciones y llamar de nuevo a los trabajadores, indica la carta firmada por Al Linares, director de Recursos Humanos de Trump Miami Resorts Management.

The post Empresa de Trump despide a 560 empleados de hotel en Miami-Dade appeared first on El Sol News Media.