Timothée Chalamet confesó qué fotos de su pasado le hacen sentir vergüenza

Timothée Chalamet confesó sentirse inseguro de su físico. Sobre todo, cuando le roban fotos en las que no puede controlar su propia imagen.

Hace un año en el Festival de Venecia, ciudad a la que acudió para presentar mundialmente su nueva película, The King, junto a su compañera de reparto Lily-Rose Depp, sucedió.

Un viaje promocional que ambos aprovecharon después para tomarse unos días de vacaciones por Italia con tan mala fortuna que un grupo de paparazzi les pilló en bañador besándose a bordo de un yate.

Las imágenes confirmaron su romance, uno que no duró mucho, ya que en abril de 2020 Chalamet aseguró en una entrevista que volvía a estar soltero.

Puedes leer: Cardi B publicó por accidente una foto en topless

«Aquella noche me fui a la cama pensando que había tenido uno de los mejores días de mi vida. Estaba en un barco con alguien que amaba realmente. Así que antes de cerrar mis ojos recuerdo que me dije: ‘Esto ha sido genial», explicó el actor en una entrevista publicada en la edición americana de GQ, de la que es portada.

«Pero cuando me levanté todo cambió. Esas fotos robadas estaban por todas partes y yo me sentí avergonzado», dijo.

«Parecía un nuevo rico y además estaba totalmente pálido. Lo más fuerte es que la gente comenzó a decir que eran fotos pactadas. Que lo hacíamos para promocionar la película. ¿En serio alguien cree que yo querría salir así delante de nadie?», dijo.

The post Timothée Chalamet confesó qué fotos de su pasado le hacen sentir vergüenza appeared first on El Sol News Media.