El documental que muestra cómo se vivió la COVID-19 en Italia

Sasha Joelle Achilli es una directora italiana ganadora del BAFTA y un Emmy por su trabajo como documentalista. Una de sus obras más reconocidas es de su viaje al oeste africano entre 2014 y 2015, para retratar la realidad del brote de ébola. Este año, después de que su natal Milán se convirtiera en una de las ciudades más afectadas por la COVID-19, con ayuda de la organización Frontline, Achilli comenzó a documentar la lucha contra el nuevo coronavirus.

«Inside Italy’s COVID War», se transmitió en el programa Frontline el martes en la mayoría de las estaciones de PBS.

Como se trataba de Italia y su padre aún vive ahí, la historia del coronavirus también era más personal para ella.

Puedes leer: Buscando a Quino: La historia de un genio

Italia fue el primer país europeo en convertirse en epicentro de la pandemia. Frontline tiene otros proyectos sobre el coronavirus en producción, incluyendo un documental para el 16 de junio que indaga qué falló en la respuesta a la pandemia y otros sobre la caída financiera y las teorías conspiratorias.

«Tras haber visto lo que le sucedió al sistema de salud, tras haber visto lo que pasaron los médicos, pienso que el confinamiento y estas medidas draconianas son la única manera de que esto esté bajo control», dijo Achilli.

The post El documental que muestra cómo se vivió la COVID-19 en Italia appeared first on El Sol News Media.