Vocero policial de Philly murió a consecuencia del contagio con coronavirus

La COVID-19 ha tomado la vida de muchos. Cada pérdida es sensible. Cada humanidad necesaria. La Ciudad a diario lamenta los fallecidos, que de acuerdo al conteo de hoy arribaron a 45 en Filadelfia, pero uno de ellos es parte de la institución.

El alcalde Jim Kenney anunció la primera muerte de un empleado de la ciudad, el teniente de la policía de Filadelfia James Walker.

“Este fin de semana, perdimos a un amigo, a un familiar, a un héroe”, dijo el alcalde. “Cualquier muerte es trágica, pero hoy, golpea cerca de casa. Hemos visto la primera muerte en nuestra familia de empleados de la ciudad. El dolor de los hermanos y hermanas del Teniente Walker en la fuerza se agrava por su reciente pérdida del Sargento James O’Connor, otra vida que no pudo ser llorada completamente debido a las restricciones de la reunión en torno a COVID-19”.

Puedes leer: Fallece por coronavirus un supervisor de enfermería en Filadelfia

“Este es un recordatorio desgarrador de que el virus está afectando a la gente de nuestra comunidad, especialmente a los que están en el frente”, apuntó Kenney.

Actualización de datos

El Departamento de Salud Pública de Filadelfia anunció hoy 539 casos adicionales de coronavirus COVID-19 en Filadelfia. Eso eleva el número de casos confirmados a 3.728. Este gran aumento sobre el total del domingo se atribuye parcialmente a un atraso en las pruebas de laboratorio; algunos laboratorios no reportan resultados durante el fin de semana.

El Departamento de Salud confirmó dos muertes adicionales en Filadelfia. Esto eleva a 45 el número de residentes que han sucumbido al virus en Filadelfia. Dieciocho de las 45 muertes están en residentes de centros de cuidados a largo plazo.

El Departamento de Salud Pública informa de que 495 pacientes con COVID-19 están siendo tratados actualmente en hospitales de Filadelfia, con un total de 887 personas hospitalizadas en la región (incluida Filadelfia).

El Departamento de Salud Pública volvió a señalar grupos de casos positivos en entornos congregados, incluidos hogares de ancianos, instalaciones de salud conductual y el Departamento de Prisiones. Cuatro reclusos más han dado positivo, con lo que el total asciende a 54.

Sitios de prueba

El Departamento de Salud Pública anunció que el sitio de pruebas de Citizens Bank Park será descontinuado después de las 6 p.m. el viernes 10 de abril. Esta determinación fue hecha por FEMA, que la ciudad apoya. Permite que los equipos de prueba restantes se redistribuyan a sitios interiores para ampliar su capacidad de pruebas, y cualquier equipo de protección personal (PPE) restante se redistribuirá para apoyar a los hospitales y centros de atención a largo plazo.

El centro de la ciudad, anunciado la semana pasada, continuará sirviendo a aquellos que tienen más de 50 años y muestran síntomas consistentes con el coronavirus COVID-19, así como a los trabajadores de la salud que muestran síntomas consistentes con el coronavirus COVID-19. El sitio está disponible sólo con cita previa y se requiere una remisión. Aquellos que cumplan con los criterios y quieran una prueba pueden llamar al (267) 491-5870 para obtener una referencia.

Puedes leer: Estatus migratorio en Philly no excluye recibir atención médica ante la COVID-19

El Departamento de Salud ha ampliado la definición de los trabajadores de la salud que son elegibles para hacerse la prueba del coronavirus COVID-19 en los sitios de prueba de la ciudad. “Trabajador de la salud” ahora se refiere a lo siguiente:

Médicos clínicos

Los proveedores de servicios de emergencia

Trabajadores de hogares de ancianos

Trabajadores de cuidados a domicilio

El personal no clínico que tiene contacto directo con el paciente

Los trabajadores de la salud del comportamiento

Las personas que trabajan en entornos de congregación, incluidos los refugios para personas sin hogar y las prisiones

The post Vocero policial de Philly murió a consecuencia del contagio con coronavirus appeared first on El Sol News Media.